0 20 40 60 80 100 0

20

40

60

80

100

Measure of Effectiveness (MOE)

HMS vs. HYSPLIT (100 ug/m3 forecast)

Percent Overlap of HMS Plume (Less Under-prediction --->)

Percent Overlap of HYSPLIT Plume (Less Over-prediction --->)