Integrated: 0000 UTC MAR 06 2014 to: 0100 UTC MAR 06 2014 > 100 ug/m3 > 20 ug/m3 > 5 ug/m3 > 1 ug/m3 Maximum: 2.9E+00 ug/m3 Minimum: 2.1E-28 ug/m3